<script lang="ts">
import DatasetName from './meta-form/DatasetName.svelte';
import SelectLoraType from './meta-form/SelectLoraType.svelte';
import SelectModel from './meta-form/SelectModel.svelte';
import TargetSize from './meta-form/TargetSize.svelte';
import UnifiedSizeChoice from './meta-form/UnifiedSizeChoice.svelte';
</script>

<div class="flex flex-col gap-2 px-4 py-4">
  <DatasetName />
  <SelectModel />
  <SelectLoraType />
  <UnifiedSizeChoice />
  <TargetSize />
</div>
